Aurel Voss an W. C. Röntgen (01.01.1896)
author: Aurel Voss
edition published: 2023-10-05
availability: CC BY-NC-SA (https://creativecommons.org/licenses/by-nc-sa/4.0/)

<?xml version="1.0" encoding="UTF-8"?><TEI xmlns="http://www.tei-c.org/ns/1.0"><teiHeader><fileDesc><titleStmt><title type="main">81110</title></titleStmt><publicationStmt><publisher>tranScriptorium</publisher></publicationStmt><sourceDesc><bibl><publisher>TRP document creator: Marcel Michels M.A.</publisher></bibl></sourceDesc></fileDesc></teiHeader><facsimile xml:id="facs_1"><surface lrx="1654" lry="1057" ulx="0" uly="0"><graphic height="1057px" url="81110_1.jpg" width="1654px"/><zone points="19,0 19,128 103,128 103,0" rendition="TextRegion" xml:id="facs_1_r1"> </zone></surface></facsimile><text><body><pb facs="#facs_1" n="1"/><p facs="#facs_1_r1"/><p facs="#facs_1_r2"> <lb facs="#facs_1_r2l1" n="N001"/>Königreich Bayern. <lb facs="#facs_1_r2l4" n="N002"/>Postkarte. <lb facs="#facs_1_r2l6" n="N003"/>An <lb facs="#facs_1_r2l7" n="N004"/>Herrn <lb facs="#facs_1_line_1604764853007_35" n="N005"/>Professor Dr W Röntgen <lb facs="#facs_1_line_1604764970068_59" n="N006"/>in hier <lb facs="#facs_1_line_1604764945493_51" n="N007"/>Pleicherring 8.</p><pb facs="#facs_2" n="2"/><p facs="#facs_2_r1"> <lb facs="#facs_2_r1l1" n="N001"/>Verehrter Herr Collg <lb facs="#facs_2_r1l2" n="N002"/>Für Ihre sehr interessante Mittheilung <lb facs="#facs_2_r1l3" n="N003"/>die ich leider nicht in den Sitzungen <lb facs="#facs_2_r1l4" n="N004"/>mit habe anhören können meinen herzlichen <lb facs="#facs_2_r1l5" n="N005"/>Dank! Mit den besten Wünschen <lb facs="#facs_2_line_1604765093911_80" n="N006"/>zum neuen Jahre <lb facs="#facs_2_r1l9" n="N007"/>Ihr <lb facs="#facs_2_r1l10" n="N008"/>ergebener <lb facs="#facs_2_line_1604765142776_90" n="N009"/>A Voss <lb facs="#facs_2_line_1604765127549_86" n="N010"/>W. 1/I 96. </p></body></text></TEI>